<!DOCTYPE html PUBLIC "-//W3C//DTD XHTML 1.0 Transitional//EN">
<html xmlns:xlink="http://www.w3.org/1999/xlink" xmlns:mml="http://www.w3.org/1998/Math/MathML">
<link rel="stylesheet" type="text/css" href="../../../CSS_FULL/edps_full.css">
<body><div id="contenu_olm">

<!-- DOI: 10.1051/0004-6361/200811136 -->

<h2 class="sec">Online Material</h2>

<p>

<h2 class="sec"><a name="SECTION000100000000000000000"></a><A NAME="btf:sec:appendix-atlas"></A>
Appendix A: Atlas
</h2>

<p>
The Appendix contains summary panels for all galaxies of our sample
(Figs.&nbsp;<a href="/articles/aa/full_html/2009/38/aa11136-08/aa11136-08.html#fig:btf:d500-2">A.1</a>-<a href="/articles/aa/full_html/2009/38/aa11136-08/aa11136-08.html#fig:btf:d646-7">A.11</a>) and channel maps for
the galaxies from the rotation curve sub-sample
(Figs.&nbsp;<a href="/articles/aa/full_html/2009/38/aa11136-08/aa11136-08.html#fig:btf:d500-2-chan">A.12</a>-<a href="/articles/aa/full_html/2009/38/aa11136-08/aa11136-08.html#fig:btf:d631-7-chan">A.17</a>).

<p>
The summary panels consist of two rows with three panels each, and
contain the following maps:

<p>
<B>Top row:</B> <EM>Left panel</EM>: zeroth moment map with
grayscales. Unless mentioned otherwise, grayscales run from a column
density of 
<!-- MATH: $n_{\rm HI}=1\times 10^{19}\ {\rm cm}^{-2}$ -->
<IMG
 WIDTH="116" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img136.png"
 ALT="$n_{\rm HI}=1\times 10^{19}\ {\rm cm}^{-2}$">
(white) to

<!-- MATH: $n_{\rm HI}=2\times 10^{21}\ {\rm cm}^{-2}$ -->
<IMG
 WIDTH="117" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img137.png"
 ALT="$n_{\rm HI}=2\times 10^{21}\ {\rm cm}^{-2}$">
(black).  The 3<IMG
 WIDTH="13" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img25.png"
 ALT="$\sigma$">
level
is indicated by the black contour. <EM>Middle panel</EM>: first moment
map. The systemic velocity is indicated by the thick contour, the
contours are spaced by 10&nbsp;km&nbsp;s<sup>-1</sup>. The approaching side can be identified
by the light grayscales and black contours, and the receding side by
dark grayscales and white contours.  <EM>Right panel</EM>: second moment
map. Grayscales run from 2 to 40&nbsp;km&nbsp;s<sup>-1</sup>. Unless mentioned otherwise, the
contours levels are given at 5, 10, and 15&nbsp;km&nbsp;s<sup>-1</sup>.  For all moment maps,
the beam size is indicated in the bottom right corner.  Additionally,
if a kinematic center has been independently derived, it is indicated
in all moment maps by a cross.

<p>
<B>Bottom row:</B> <EM>Left panel</EM>: major axis position-velocity
diagram. The position angle of the slice indicated in the top-left
corner of the panel.  Grayscales run from 2<IMG
 WIDTH="13" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img25.png"
 ALT="$\sigma$">
to 30<IMG
 WIDTH="13" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img25.png"
 ALT="$\sigma$">,
and
contour levels are given at 
<!-- MATH: $2\sigma + n \times 4\sigma$ -->
<IMG
 WIDTH="73" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img138.png"
 ALT="$2\sigma + n \times 4\sigma$">
(i.e.,
2, 6, 10, 14, 18 ... <IMG
 WIDTH="13" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img25.png"
 ALT="$\sigma$">). The dashed line indicates the systemic
velocity.  If a <I>V</I><SUB><I>pv</I></SUB> has been derived, the resulting velocities at
either side of the rotation curve are indicated by arrows.
<EM>Middle panel</EM>: minor axis position-velocity diagram. Grayscales
and contours are identical to the major axis position-velocity
diagram.  <EM>Right panel</EM>: global H&nbsp; <SMALL>I</SMALL>&nbsp;profile of the Hanning
smoothed data cube.

<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d500-2">&#160;</A><!-- end Label--><A NAME="2093"></A><A NAME="figure1710"
 HREF="img140.png"><IMG
 WIDTH="168" HEIGHT="109" SRC="Timg140.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA1.ps}
\end{figure}"></A><!-- HTML Figure number: 9 --></td>
<td class="img-txt"><span class="bold">Figure A.1:</span><p>
Summary panel for D500-2. A
     general description of the panels and levels is given at the
     beginning of the Appendix.  The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the zeroth
     moment map corresponds to a flux of 5.09&nbsp;mJy, which translates to
     a column density limit of 
<!-- MATH: $n_{\rm HI}=8.8\times10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img139.png"
 ALT="$n_{\rm HI}=8.8\times10^{19}~{\rm cm}^{-2}$">.
</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=9&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d500-3">&#160;</A><!-- end Label--><A NAME="2094"></A><A NAME="figure1719"
 HREF="img142.png"><IMG
 WIDTH="168" HEIGHT="109" SRC="Timg142.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA2.ps}
\end{figure}"></A><!-- HTML Figure number: 10 --></td>
<td class="img-txt"><span class="bold">Figure A.2:</span><p>
Summary panel for D500-3. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the
     zeroth moment map corresponds to a flux of 4.51&nbsp;mJy,
     which translates to a column density limit of
     
<!-- MATH: $n_{\rm HI}=5.2\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img141.png"
 ALT="$n_{\rm HI}=5.2\times 10^{19}~{\rm cm}^{-2}$">.
</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=10&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d512-2">&#160;</A><!-- end Label--><A NAME="2095"></A><A NAME="figure1728"
 HREF="img144.png"><IMG
 WIDTH="171" HEIGHT="109" SRC="Timg144.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA3.ps}
\end{figure}"></A><!-- HTML Figure number: 11 --></td>
<td class="img-txt"><span class="bold">Figure A.3:</span><p>
Summary panel for D512-2. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the zeroth
     moment map corresponds to a flux of 5.50&nbsp;mJy, which translates to
     a column density limit of 
<!-- MATH: $n_{\rm HI}=3.3\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img143.png"
 ALT="$n_{\rm HI}=3.3\times 10^{19}~{\rm cm}^{-2}$">.
</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=11&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d564-8">&#160;</A><!-- end Label--><A NAME="2096"></A><A NAME="figure1737"
 HREF="img146.png"><IMG
 WIDTH="167" HEIGHT="109" SRC="Timg146.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA4.ps}
\end{figure}"></A><!-- HTML Figure number: 12 --></td>
<td class="img-txt"><span class="bold">Figure A.4:</span><p>
Summary panel for D564-8. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the
     zeroth moment map corresponds to a flux of 4.99&nbsp;mJy,
     which translates to a column density limit of
     
<!-- MATH: $n_{\rm HI}=4.9\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img145.png"
 ALT="$n_{\rm HI}=4.9\times 10^{19}~{\rm cm}^{-2}$">.
</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=12&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d572-5">&#160;</A><!-- end Label--><A NAME="2097"></A><A NAME="figure1746"
 HREF="img150.png"><IMG
 WIDTH="168" HEIGHT="109" SRC="Timg150.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA5.ps}
\end{figure}"></A><!-- HTML Figure number: 13 --></td>
<td class="img-txt"><span class="bold">Figure A.5:</span><p>
Summary panel for D572-5. A
     general description of the panels and levels is given at the
     beginning of the Appendix. Grayscales in the zeroth moment map
     run from a column density of 
<!-- MATH: $n_{\rm HI}=1\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="117" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img147.png"
 ALT="$n_{\rm HI}=1\times 10^{19}~{\rm cm}^{-2}$">
(white) to 
<!-- MATH: $n_{\rm HI}=8\times 10^{20}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="116" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img148.png"
 ALT="$n_{\rm HI}=8\times 10^{20}~{\rm cm}^{-2}$">
(black).  The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the zeroth
     moment map corresponds to a flux of 12.47&nbsp;mJy, which translates
     to a column density limit of 
<!-- MATH: $n_{\rm HI}=1.4\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img149.png"
 ALT="$n_{\rm HI}=1.4\times 10^{19}~{\rm cm}^{-2}$">.
</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=13&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d575-1">&#160;</A><!-- end Label--><A NAME="2098"></A><A NAME="figure1763"
 HREF="img152.png"><IMG
 WIDTH="168" HEIGHT="109" SRC="Timg152.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA6.ps}
\end{figure}"></A><!-- HTML Figure number: 14 --></td>
<td class="img-txt"><span class="bold">Figure A.6:</span><p>
Summary panel for D575-1. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the zeroth
     moment map corresponds to a flux of 9.81&nbsp;mJy, which translates to
     a column density limit of 
<!-- MATH: $n_{\rm HI}=1.3\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img151.png"
 ALT="$n_{\rm HI}=1.3\times 10^{19}~{\rm cm}^{-2}$">.
The contours in the second moment
     map are at 7.5&nbsp;km&nbsp;s<sup>-1</sup> and 9&nbsp;km&nbsp;s<sup>-1</sup>.  </p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=14&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d575-2">&#160;</A><!-- end Label--><A NAME="2099"></A><A NAME="figure1778"
 HREF="img153.png"><IMG
 WIDTH="168" HEIGHT="109" SRC="Timg153.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA7.ps}
\end{figure}"></A><!-- HTML Figure number: 15 --></td>
<td class="img-txt"><span class="bold">Figure A.7:</span><p>
Summary panel for D575-2. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the
     zeroth moment map corresponds to a flux of 5.58&nbsp;mJy,
     which translates to a column density limit of
     
<!-- MATH: $n_{\rm HI}=2.0\times 10^{19}\ {\rm cm}^{-2}$ -->
<IMG
 WIDTH="127" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img12.png"
 ALT="$n_{\rm HI}=2.0\times 10^{19}\ {\rm cm}^{-2}$">.
</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=15&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d575-5">&#160;</A><!-- end Label--><A NAME="2100"></A><A NAME="figure1787"
 HREF="img155.png"><IMG
 WIDTH="168" HEIGHT="109" SRC="Timg155.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA8.ps}
\end{figure}"></A><!-- HTML Figure number: 16 --></td>
<td class="img-txt"><span class="bold">Figure A.8:</span><p>
Summary panel for D575-5. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the
     zeroth moment map corresponds to a flux of 8.82&nbsp;mJy,
     which translates to a column density limit of
     
<!-- MATH: $n_{\rm HI}=0.6\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="127" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img154.png"
 ALT="$n_{\rm HI}=0.6\times 10^{19}~{\rm cm}^{-2}$">.
The contours in the
     second moment map are given at 6&nbsp;km&nbsp;s<sup>-1</sup> and 7.5&nbsp;km&nbsp;s<sup>-1</sup>.   </p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=16&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d631-7">&#160;</A><!-- end Label--><A NAME="2101"></A><A NAME="figure1802"
 HREF="img157.png"><IMG
 WIDTH="168" HEIGHT="109" SRC="Timg157.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136fA9.ps}
\end{figure}"></A><!-- HTML Figure number: 17 --></td>
<td class="img-txt"><span class="bold">Figure A.9:</span><p>
Summary panel for D631-7. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the
     zeroth moment map corresponds to a flux of 11.06&nbsp;mJy,
     which translates to a column density limit of
     
<!-- MATH: $n_{\rm HI}=3.7\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="127" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img156.png"
 ALT="$n_{\rm HI}=3.7\times 10^{19}~{\rm cm}^{-2}$">.
</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=17&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d640-13">&#160;</A><!-- end Label--><A NAME="2102"></A><A NAME="figure1811"
 HREF="img158.png"><IMG
 WIDTH="170" HEIGHT="110" SRC="Timg158.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A10.ps}
\end{figure}"></A><!-- HTML Figure number: 18 --></td>
<td class="img-txt"><span class="bold">Figure A.10:</span><p>
Summary panel for D640-13. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">
contour in the
     zeroth moment map corresponds to a flux of 11.49&nbsp;mJy,
     which translates to a column density limit of
     
<!-- MATH: $n_{\rm HI}=3.3\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img143.png"
 ALT="$n_{\rm HI}=3.3\times 10^{19}~{\rm cm}^{-2}$">.
The contours in the
     second moment map are given at 7.5&nbsp;km&nbsp;s<sup>-1</sup> and 10&nbsp;km&nbsp;s<sup>-1</sup>.   </p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=18&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d646-7">&#160;</A><!-- end Label--><A NAME="2103"></A><A NAME="figure1826"
 HREF="img160.png"><IMG
 WIDTH="170" HEIGHT="110" SRC="Timg160.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A11.ps}
\end{figure}"></A><!-- HTML Figure number: 19 --></td>
<td class="img-txt"><span class="bold">Figure A.11:</span><p>
Summary panel for D646-7. A
     general description of the panels and levels is given at the
     beginning of the Appendix. The <IMG
 WIDTH="20" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img3.png"
 ALT="$3\sigma $">&nbsp;contour in the
     zeroth moment map corresponds to a flux of 7.92&nbsp;mJy,
     which translates to a column density limit of
     
<!-- MATH: $n_{\rm HI}=0.7\times 10^{19}~{\rm cm}^{-2}$ -->
<IMG
 WIDTH="128" HEIGHT="30" ALIGN="MIDDLE" BORDER="0"
 SRC="img159.png"
 ALT="$n_{\rm HI}=0.7\times 10^{19}~{\rm cm}^{-2}$">.
The contours in the
     second moment map are given at 7.5&nbsp;km&nbsp;s<sup>-1</sup> and&nbsp;9&nbsp;km&nbsp;s<sup>-1</sup>.   </p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=19&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d500-2-chan">&#160;</A><!-- end Label--><A NAME="2104"></A><A NAME="figure1841"
 HREF="img161.png"><IMG
 WIDTH="171" HEIGHT="202" SRC="Timg161.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A12.ps}
\end{figure}"></A><!-- HTML Figure number: 20 --></td>
<td class="img-txt"><span class="bold">Figure A.12:</span><p>
Channel maps of D500-2. Grayscales
     run from&nbsp;-0.02 to 7&nbsp;mJy. Every second channel is shown.</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=20&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d500-3-chan">&#160;</A><!-- end Label--><A NAME="2105"></A><A NAME="figure1846"
 HREF="img162.png"><IMG
 WIDTH="171" HEIGHT="202" SRC="Timg162.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A13.ps}
\end{figure}"></A><!-- HTML Figure number: 21 --></td>
<td class="img-txt"><span class="bold">Figure A.13:</span><p>
Channel maps of D500-3. Grayscales
     run from&nbsp;-0.02 to 5&nbsp;mJy. Every channel is shown.</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=21&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d512-2-chan">&#160;</A><!-- end Label--><A NAME="2106"></A><A NAME="figure1851"
 HREF="img163.png"><IMG
 WIDTH="170" HEIGHT="201" SRC="Timg163.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A14.ps}
\end{figure}"></A><!-- HTML Figure number: 22 --></td>
<td class="img-txt"><span class="bold">Figure A.14:</span><p>
Channel maps of D512-2. Grayscales
     run from&nbsp;-0.02 to 8&nbsp;mJy. Every second channel is shown.</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=22&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div><div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d564-8-chan">&#160;</A><!-- end Label--><A NAME="2107"></A><A NAME="figure1856"
 HREF="img164.png"><IMG
 WIDTH="171" HEIGHT="205" SRC="Timg164.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A15.ps}
\end{figure}"></A><!-- HTML Figure number: 23 --></td>
<td class="img-txt"><span class="bold">Figure A.15:</span><p>
Channel maps of D564-8. Grayscales
     run from&nbsp;-0.02 to 7&nbsp;mJy. Every channel is shown.</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=23&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d575-2-chan">&#160;</A><!-- end Label--><A NAME="2108"></A><A NAME="figure1861"
 HREF="img165.png"><IMG
 WIDTH="171" HEIGHT="201" SRC="Timg165.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A16.ps}
\end{figure}"></A><!-- HTML Figure number: 24 --></td>
<td class="img-txt"><span class="bold">Figure A.16:</span><p>
Channel maps of D575-2. Grayscales
     run from&nbsp;-0.02 to 10&nbsp;mJy. Every fourth channel is shown.</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=24&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:btf:d631-7-chan">&#160;</A><!-- end Label--><A NAME="2109"></A><A NAME="figure1866"
 HREF="img166.png"><IMG
 WIDTH="171" HEIGHT="200" SRC="Timg166.png"
 ALT="\begin{figure}
\par\includegraphics[width=15cm,clip]{11136A17.ps}
\end{figure}"><!-- HTML Figure number: 25 --></td>
<td class="img-txt"><span class="bold">Figure A.17:</span><p>
Channel maps of D631-7. Grayscales
     run from&nbsp;-0.02 to 25&nbsp;mJy. Every second channel is shown.</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=25&DOI=10.1051/0004-6361/200811136" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<br>

</div></body></html>