<!DOCTYPE html PUBLIC "-//W3C//DTD XHTML 1.0 Transitional//EN">
<html xmlns:xlink="http://www.w3.org/1999/xlink" xmlns:mml="http://www.w3.org/1998/Math/MathML">
<link rel="stylesheet" type="text/css" href="../../../CSS_FULL/edps_full.css">
<body><div id="contenu_olm">

<!-- DOI: 10.1051/0004-6361/201014572 -->

<h2 class="sec">Online Material</h2>

<p></p><div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="f2"></A><!-- end Label--><A NAME="599"></A><A NAME="figure514" HREF="img38.png"><IMG SRC="Timg38.png" ALT="\begin{figure}
\par\includegraphics[width=16.6cm,clip]{14572f2.eps}
\end{figure}" HEIGHT="112" WIDTH="187"></A><!-- HTML Figure number: 2 -->
</td>
<td class="img-txt"><span class="bold">Figure 2:</span><p>
Colour images from the three PACS bands (BS, BL and R in the blue, green
and red channels) for the three clusters within radius of 2.5' of the BCG. 
The <i> top row</i> are images combined
in their original  resolution and the <i> bottom row</i> are the images combined
with a common smoothing of 12'' to match resolution.
</td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=2&DOI=10.1051/0004-6361/201014572" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p></p><div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="f3"></A><!-- end Label--><A NAME="600"></A><A NAME="figure521" HREF="img40.png"><IMG SRC="Timg40.png" ALT="\begin{figure}
\par\includegraphics[width=16.6cm,clip]{14572f3.eps}
\end{figure}" HEIGHT="127" WIDTH="187"></A><!-- HTML Figure number: 3 -->
</td>
<td class="img-txt"><span class="bold">Figure 3:</span><p>
Colour images from the three SPIRE bands (PSW, PMW and PLW in the blue, green
and red channels) for full field covered for the three clusters covering
approximately 
<!-- MATH: $12'~\times 12'$ -->
<IMG SRC="img39.png" ALT="$12'~\times 12'$" ALIGN="MIDDLE" BORDER="0" HEIGHT="26" WIDTH="58">.
The <i> top row</i> are images combined
in their original  resolution and the <i> bottom row</i> are the images combined
with a common smoothing of 36'' to match resolution and clipped to
remove areas of low exposure. The BCG is at the centre of the image
and in A2597 and Zw3146 is the bluest object present (see text).
</td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=3&DOI=10.1051/0004-6361/201014572" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p></p>
</div></body></html>