<!DOCTYPE html PUBLIC "-//W3C//DTD XHTML 1.0 Transitional//EN">
<html xmlns:xlink="http://www.w3.org/1999/xlink" xmlns:mml="http://www.w3.org/1998/Math/MathML">
<link rel="stylesheet" type="text/css" href="../../../CSS_FULL/edps_full.css">
<body><div id="contenu_olm">

<!-- DOI: 10.1051/0004-6361/201014576 -->

<h2 class="sec">Online Material</h2>
<p></p><div class="inset-old">
<table>
<tr><td><!-- init Label --><A NAME="fig:pdr"></A><!-- end Label--><A NAME="1000"></A><A NAME="figure834" HREF="img108.png"><IMG SRC="Timg108.png" ALT="\begin{figure}
\par\includegraphics[angle=-90,width=15cm,clip]{14576fig2.eps}
\end{figure}" HEIGHT="85" WIDTH="170"></A><!-- HTML Figure number: 2 -->
</td>
<td class="img-txt"><span class="bold">Figure 2:</span><p>
Predictions of the Meudon-PDR model for a slab of <i>A</i><sub><i>v</i></sub>
= 1&nbsp;mag illuminated from both sides. The radiation field and
gas density are given in each panel. Full lines: <i>n</i>(OH<sup>+</sup>)/<i>n</i>(H<sub>2</sub>O<sup>+</sup>),
dotted lines: <i>n</i>(OH)/<i>n</i>(OH<sup>+</sup>),
dashed lines: <i>n</i>(H<sub>3</sub>O<sup>+</sup>)/<i>n</i>(OH<sup>+</sup>).
Equation&nbsp;(2) determined for each Av in the model is shown in
green.
</td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=2&DOI=10.1051/0004-6361/201014576" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p></p>

</div></body></html>