G350.706+0.998

G350.889+0.728

G350.870+0.762

G351.766+0.492

G351.65+0.51

G351.68+0.61

G351.69+0.67

G350.50+0.95

G350.401+1.037

G350.675+0.832

G350.617+0.983

G350.239+0.654

G350.710+0.642

G351.359+1.014

G351.261+1.016

G351.479+0.644

G351.462+0.556

GM1-24

HII 351.2+0.5

GUM 64b

GUM 64c

GUM 61

GUM 63

350.0

+0.4+0.8+1.2351.0

352.0

+0.4+0.8+1.2