290.71 291.11 291.50 291.90 292.30 292.69 293.09 293.48

Rest Frequency [GHz]

288.70 289.09 289.49 289.88 290.27 290.66 291.06 291.45

-300

-200

-100 0 100 200

H13CCCN HC3N p-H2CO o-H2CO C33S HC3Nv6=1

HC3Nv7=1

HC3Nv6,7=1

CH3OH

H213CS HC3Nv7=2

Sky Frequency [GHz]

Flux Density [mJy]