289.00 289.27 289.55 289.82 290.09 290.37 290.64 290.91

Rest Frequency [GHz]

287.00 287.27 287.54 287.81 288.09 288.36 288.63 288.90

-250

-200

-150

-100 -50 0 50 100 150

C34S HCC13CN CH3OH CH3CCH

34SO p-H2CO

Sky Frequency [GHz]

Flux Density [mJy]