280.84 281.26 281.68 282.10 282.51 282.93 283.35 283.76

Rest Frequency [GHz]

278.90 279.31 279.73 280.14 280.56 280.97 281.39 281.80

-300

-200

-100

0

100

200

o-H2CO NH2CN HC3N c-HCCCH H13CCCN

HC3Nv6=1

HC3Nv7=1

HC3Nv6,7=1

Sky Frequency [GHz]

Flux Density [mJy]