278.83 279.15 279.46 279.78 280.10 280.41 280.73 281.05

Rest Frequency [GHz]

276.90 277.21 277.53 277.84 278.16 278.47 278.79 279.10

-300

-200

-100 0 100 200

N2H+ c-HCCCH NH2CN HCC13CN

Sky Frequency [GHz]

Flux Density [mJy]