276.92 277.22 277.52 277.82 278.13 278.43 278.73 279.03

Rest Frequency [GHz]

275.00 275.30 275.60 275.90 276.20 276.50 276.80 277.10

-150

-100 -50 0 50 100

13CS c-HCCCH NH2CN CH2NH H2CS

Sky Frequency [GHz]

Flux Density [mJy]