271.53 271.84 272.15 272.46 272.77 273.08 273.39 273.69

Rest Frequency [GHz]

269.65 269.96 270.26 270.57 270.88 271.19 271.49 271.80

-600

-400

-200 0 200 400

HCC13CN c-HCCCH HNCv2=1 HNC C34S HC3N CH3CCH

H13CCCN HC3Nv6=1

HC3Nv7=1

Sky Frequency [GHz]

Flux Density [mJy]