269.77 270.05 270.33 270.61 270.89 271.17 271.45 271.73

Rest Frequency [GHz]

267.90 268.18 268.46 268.74 269.01 269.29 269.57 269.85

-100

-50

0

50

100

H2CS

Sky Frequency [GHz]

Flux Density [mJy]