267.75 268.07 268.39 268.70 269.02 269.34 269.65 269.97

Rest Frequency [GHz]

265.90 266.21 266.53 266.84 267.16 267.47 267.79 268.10

-150

-100 -50 0 50 100

H213CS

Sky Frequency [GHz]

Flux Density [mJy]