265.64 265.97 266.30 266.63 266.96 267.29 267.62 267.96

Rest Frequency [GHz]

263.80 264.13 264.46 264.79 265.11 265.44 265.77 266.10

-600

-400

-200 0 200 400

c-HCCCH HCNv2=1 HCN CH2NH

HCO+

Sky Frequency [GHz]

Flux Density [mJy]