263.52 263.81 264.10 264.39 264.68 264.96 265.25 265.54

Rest Frequency [GHz]

261.70 261.99 262.27 262.56 262.84 263.13 263.41 263.70

-200

-100

0

100

200

HC3N CH2NH HC3Nv6=1 HC3Nv7=1 H13CCCN HC3Nv6,7=1

HC3Nv7=2

Sky Frequency [GHz]

Flux Density [mJy]