256.43 256.73 257.04 257.34 257.65 257.95 258.26 258.56

Rest Frequency [GHz]

254.65 254.95 255.26 255.56 255.86 256.16 256.47 256.77

-150

-100 -50 0 50 100

34SO CH2NH CH3CN

29SiO

NH2CN SO

Sky Frequency [GHz]

Flux Density [mJy]