253.66 254.08 254.50 254.93 255.35 255.78 256.20 256.63

Rest Frequency [GHz]

251.90 252.32 252.74 253.16 253.59 254.01 254.43 254.85

-300

-200

-100 0 100 200

NS30SiO

CH2NH HC3N HC3Nv6=1

HC3Nv7=1 HC18O+ H13CCCN

HC3Nv6,7=1 HCS+

HC3Nv7=2 CH3CCH

Sky Frequency [GHz]

Flux Density [mJy]