251.64 251.96 252.28 252.59 252.91 253.22 253.54 253.86

Rest Frequency [GHz]

249.90 250.21 250.53 250.84 251.16 251.47 251.79 252.10

-200

-150

-100 -50 0 50 100

c-HCCCH SOc-HCCCH

34SO NSHCC13CN

Sky Frequency [GHz]

Flux Density [mJy]