248.37 248.82 249.28 249.73 250.18 250.64 251.09 251.54

Rest Frequency [GHz]

246.65 247.10 247.55 248.00 248.45 248.90 249.35 249.80

-150

-100 -50 0 50 100

c-HCCCH CH2NH

Sky Frequency [GHz]

Flux Density [mJy]