232.91 233.13 233.34 233.56 233.78 233.99 234.21 234.42

Rest Frequency [GHz]

231.30 231.51 231.73 231.94 232.16 232.37 232.59 232.80 -80 -60 -40 -20 0 20 40 60

Sky Frequency [GHz]

Flux Density [mJy]