230.90 231.19 231.47 231.76 232.05 232.34 232.62 232.91

Rest Frequency [GHz]

229.30 229.59 229.87 230.16 230.44 230.73 231.01 231.30

-100

-50

0

50

13CS

Sky Frequency [GHz]

Flux Density [mJy]