217.41 217.68 217.96 218.23 218.51 218.79 219.06 219.34

Rest Frequency [GHz]

215.90 216.17 216.45 216.72 217.00 217.27 217.55 217.82

-250

-200

-150

-100 -50 0 50 100 150

c-HCCCH

p-H2CO HC3N NH2CN HC3Nv6=1

HC3Nv7=1

Sky Frequency [GHz]

Flux Density [mJy]