215.59 215.88 216.17 216.46 216.74 217.03 217.32 217.61

Rest Frequency [GHz]

214.10 214.39 214.67 214.96 215.24 215.53 215.81 216.10

-100

-50

0

50

34SO c-HCCCH H2Sc-HCCCH

SiOHCC13CN

Sky Frequency [GHz]

Flux Density [mJy]