110.67 111.10 111.53 111.96 112.39 112.82 113.26 113.69

Rest Frequency [GHz]

109.90 110.33 110.76 111.19 111.61 112.04 112.47 112.90

-100 -80 -60 -40 -20 0 20 40 60

HC5N CNCNCCS CN

Sky Frequency [GHz]

Flux Density [mJy]