108.65 108.97 109.29 109.60 109.92 110.23 110.55 110.87

Rest Frequency [GHz]

107.90 108.21 108.53 108.84 109.16 109.47 109.79 110.10 -80 -60 -40 -20 0 20 40

HC5N HC3N SOHC3Nv6=1

HC3Nv6=1 HC3Nv7=1

HC3Nv7=2 13CO CH3CN

Sky Frequency [GHz]

Flux Density [mJy]