106.64 106.95 107.27 107.59 107.90 108.22 108.54 108.85

Rest Frequency [GHz]

105.90 106.21 106.53 106.84 107.16 107.47 107.79 108.10 -20 -15 -10 -5 0 5 10 15

Sky Frequency [GHz]

Flux Density [mJy]