104.62 104.94 105.26 105.57 105.89 106.21 106.52 106.84

Rest Frequency [GHz]

103.90 104.21 104.53 104.84 105.16 105.47 105.79 106.10

-20

-10

0

10

20

CH2NH H13CCCN CCS HC5N

Sky Frequency [GHz]

Flux Density [mJy]