102.61 102.93 103.24 103.56 103.88 104.19 104.51 104.83

Rest Frequency [GHz]

101.90 102.21 102.53 102.84 103.16 103.47 103.79 104.10 -20 -15 -10 -5 0 5 10 15

CCS HC5N

Sky Frequency [GHz]

Flux Density [mJy]