100.85 101.13 101.41 101.69 101.97 102.25 102.53 102.81

Rest Frequency [GHz]

100.15 100.43 100.71 100.99 101.26 101.54 101.82 102.10 -20 -15 -10 -5 0 5 10 15

HC5N

Sky Frequency [GHz]

Flux Density [mJy]