98.58 98.93 99.29 99.64 99.99 100.34 100.70 101.05

Rest Frequency [GHz]

97.90 98.25 98.60 98.95 99.30 99.65 100.00 100.35 -60 -40 -20 0 20 40

SONH2CN HC3N HC3Nv6=1 HC3Nv7=1 NH2CN HC3Nv7=2

Sky Frequency [GHz]

Flux Density [mJy]