96.57 96.89 97.20 97.52 97.83 98.15 98.47 98.78

Rest Frequency [GHz]

95.90 96.21 96.53 96.84 97.16 97.47 97.79 98.10 -80 -60 -40 -20 0 20 40 60

H13CCCN CSHC5N

Sky Frequency [GHz]

Flux Density [mJy]