94.55 94.87 95.19 95.50 95.82 96.14 96.45 96.77

Rest Frequency [GHz]

93.90 94.21 94.53 94.84 95.16 95.47 95.79 96.10

-20

-10

0

10

20

HC5N C34S

Sky Frequency [GHz]

Flux Density [mJy]