92.54 92.86 93.17 93.49 93.81 94.12 94.44 94.76

Rest Frequency [GHz]

91.90 92.21 92.53 92.84 93.16 93.47 93.79 94.10 -30 -20 -10 0 10 20

N2H+ HC5N CCS

Sky Frequency [GHz]

Flux Density [mJy]