90.24 90.60 90.96 91.32 91.67 92.03 92.39 92.74

Rest Frequency [GHz]

89.62 89.97 90.33 90.68 91.04 91.39 91.75 92.10 -80 -60 -40 -20 0 20 40 60

HC5N HNC C34S HC3N HC3Nv7=1

HC3Nv7=2 CH3CN 13CS

Sky Frequency [GHz]

Flux Density [mJy]