88.31 88.62 88.92 89.23 89.53 89.84 90.14 90.45

Rest Frequency [GHz]

87.70 88.00 88.31 88.61 88.91 89.21 89.52 89.82

-100

-50

0

50

HCN HCO+

Sky Frequency [GHz]

Flux Density [mJy]