86.50 86.79 87.07 87.36 87.65 87.94 88.23 88.51

Rest Frequency [GHz]

85.90 86.19 86.47 86.76 87.04 87.33 87.61 87.90 -30

-20

-10

0

10

20

H13CO+ SiOCCH CCH HC5N

Sky Frequency [GHz]

Flux Density [mJy]