84.57 84.87 85.18 85.48 85.79 86.09 86.40 86.70

Rest Frequency [GHz]

83.98 84.28 84.59 84.89 85.19 85.49 85.80 86.10

-20

-10

0

10

20

30SiO HC5N HCS+ 29SiO H13CN

Sky Frequency [GHz]

Flux Density [mJy]