-0.5 0.5 Principal components

PC 1 ( σ2=40%)

N

-0.5

0.5 T

-0.5 0.5

PC 2 ( σ2=26%)

N

-0.5

0.5 T

-0.5 0.5

PC 3 ( σ2=14%)

N

-0.5

0.5 T

SiOH2Sc-HCCCH

HC3NH2CNCH3CNCH3OHH2COCH3CCH