-40 -30 -20 -10 0 10 20 30 40 50 0 2 4 6 8 10 12 14 16

ΔT (min.)

No. of Events

Electr. WIND/3DP Timing (All Radio assoc.)

T<Electr.>-T<Prot.> T<Electr.>-T<III>

Mean: 7.1 min. Mean: 12.3 min.