M1(M⊙)

M2(M⊙)error envelopes lower boundaries ratio

0.80.91.01.11.21.31.41.51.60.80.91.01.11.21.31.41.51.60.10.20.30.40.50.60.70.80.91.0M1(M⊙)

M2(M⊙)error envelopes upper boundary ratio

0.80.91.01.11.21.31.41.51.60.80.91.01.11.21.31.41.51.6

88.6%

42.7%

83.5%0.10.20.30.40.50.60.70.80.91.0