M1(M⊙)

M2(M⊙)error envelope lower boundary

0.80.91.01.11.21.31.41.51.60.80.91.01.11.21.31.41.51.6-0.09-0.08-0.07-0.06-0.05-0.04-0.03M1(M⊙)

M2(M⊙)error envelope upper boundary

0.80.91.01.11.21.31.41.51.60.80.91.01.11.21.31.41.51.67.3%7.5%7.3%

0.050.060.070.080.09