IC342 6.2cm VLA + Effelsberg Tot. Int. HPBW=25" + WISE 22mum

Peak contour flux = 64.1 mJy/beam Levs = 0.4 mJy/beam * (1, 1.5, 2, 3, 4, 8, 16)

Declination (J2000)

Right ascension (J2000)

03 48 00 47 30 00 46 30 00 45 30

68 14

12

10

08

06

04

02

00

67 58

2 4 6