Frequency [Hz] 11 10^{13}10^{15}10^{17}10^{19}10^{21}10^{23}10^{25}10^{27}10^{28}10

]^{-1} s^{-2} [erg cm νFν

-15 10

-14 10

-13 10

-12 10

-11 10

-10 10

-9 10

-8 10

MJD 55265 1-zone SSC model 2-zone SSC model