0.0005

0.001

0.0015

0.002

0.0025

0.003

line intensity

30.0

9:00:00.0

59:00.0

8:58:00.0

20:00.0

25:00.0

-47:30:00.0

35:00.0

40:00.0

45:00.0

DEC (J2000)

RA (J2000) (b)