Fig. 2. Spectra of the stars observed with VISIR plotted in stellocentric frame and rebinned by a factor of two (average spectra are shown when there are more than one observations). The detections are plotted in the upper panel, non detections in the lower one. The green line is the Gaussian fit to the line, the red dot-dashed line is the 3œ detection threshold per pixel. The error bars shown are 1œ values per pixel.