Fig. 2. Eclipse light curves of the WD/dM binary CSS 080502 (SDSS J0908+0604) and the sdB/dM binary CSS 06833 (SDSS J1533+3759). Exposure times are 15 s. The solid lines represent the model fits, the dotted lines in the left panel indicate the FWHM.