3180

3160

3120

3100

3080

3040

3020

2980

2960

2900

2880

9.2 9.0 8.8 135.00

134.75 -6.5-6.0-5.5 3034.0

3033.8

Frequency (μHz)

Power Probability density

Δν

Δν δν_{02}

δν_{02} δν_{01}

δν_{01} ν_0

ν_0