-1

0

1 logg_{KIC} - logg_{seismic}

3.0 2.5 2.0 1.5 logg_{seismic}

-500

0

Teff_{KIC} - Teff_{seismic}

5000

4800

4600

4400

4200

4000 Teff_{seismic}