\begin{table}%t2
\par
\caption{\label{tablines}Water and CO~line emission toward NGC~7129 FIRS~2.}
\scriptsize
%\centering
\par
\begin{tabular}{r r c c c c c}
\hline \hline\noalign{\smallskip}
 Transition  & Component & rms\tablefootmark{a}  & $T_{\rm MB}^{\rm peak}$\tablefootmark{b} & $\int T_{\rm MB}~{\rm d}\varv$ \tablefootmark{b}& $V_{\rm LSR}$\tablefootmark{c} & {\it FWHM}\tablefootmark{d} \\
           & & (mK) & (K) & (K~km~s$^{-1}$) & (km~s$^{-1}$) & (km~s$^{-1}$)  \\
\hline\noalign{\smallskip}
H$_2$$^{16}$O~1$_{11}$--0$_{00}$ & no Gaussian fit & 16 &  0.59& 8.4 &--8.2  &  \\
2$_{02}$--1$_{11}$ & narrow& 20 & 0.36 & 2.3 & --7.2  &   6.2\\
                                     & broad  & 20 & 0.23 & 6.1 & --12.4& 24.6\\ 
2$_{11}$--2$_{02}$ &narrow & 16 & 0.21 & 1.5 & --7.5 & 6.5\\
                                     &broad   & 16 & 0.11  & 3.1& --13.7& 26.8\\
3$_{12}$--3$_{03}$ &narrow & 16 & 0.14 & 1.7 & --7.3 & 7.8 \\
                                     &broad   & 16 & 0.11 & 2.8 & --14.5 & 24.4 \\
H$_2$$^{18}$O~1$_{10}$--1$_{01}$ &&  5 & 0.015  & 0.071 & --8.5 & 5.3 \\
H$_2$$^{18}$O~2$_{02}$--1$_{11}$ & not seen & 5  &  &$<$0.010\tablefootmark{e}  &  &  \\
C$^{18}$O\ \ \ \ \ \ \ 5--4  & &5    & 0.16 & 0.49 & --9.8& 2.1  \\
$^{13}$CO~\  \ \ \ \ 10--9 & & 20 & 0.13 & 0.44 & --9.8& 5.5 \\
\hline
\end{tabular}
\tablefoot{\tablefoottext{a}{The rms measure is taken over a 1~km~s$^{-1}$ range.}\\
\tablefoottext{b}{Uncertainties in the peak temperature and integrated line intensity are dominated by calibration issues. For H$_2$$^{16}$O~1$_{11}$--0$_{00}$, 2$_{02}$--1$_{11}$, 3$_{12}$--3$_{03}$, and $^{13}$CO~10--9 the uncertainty is 32\%. For all other lines the uncertainty is 16\%. }\\
\tablefoottext{c}{Velocity accuracy better than $\sim$0.5 km~s$^{-1}$.}\\
\tablefoottext{d}{A 20\% uncertainty in the line widths is due primarily to the component separation.}\\
\tablefoottext{e}{The 3$\sigma$ detection limit, for data smoothed to the expected line width (5~km~s$^{-1}$), is 0.015 K.}}
\vspace*{-2mm}
\end{table}