\begin{table}%ta4
%\centering
\par
\caption{\label{tab:ex-g31-41}Gaussian fit parameters for for the full extraction of the saturated absorptions of para-H$_2$O~$1_{11}{-}0_{00}$ line in G31.41.}
  \begin{tabular}{lccc}
  \hline\hline\noalign{\smallskip}
Component & $T^*_{A}$ & $FHWM$ & $\varv_{\rm lsr}$ \\
   \#  & (K) & (\kms) & (\kms) \\
  \hline
1 & --0.08 & 1.36 & 3.79 \\
2 & --0.43 & 1.35 & 5.44 \\
3 & --0.99 & 1.06 & 6.44 \\
4 & --0.61 & 0.86 & 7.06 \\
5 & --0.35 & 0.68 & 7.57 \\
6 & --0.34 & 0.84 & 8.15 \\
7 & --0.19 & 0.88 & 8.89 \\
8 & --0.36 & 1.61 & 10.99 \\
9 & --0.59 & 1.31 & 11.72 \\
10 & --1.19 & 1.40 & 12.75 \\
11 & --0.49 & 0.98 & 13.53 \\
12 & --0.15 & 4.63 & 52.14 \\
13 & --0.21 & 4.53 & 82.84 \\
14 & 0.06 & 10.92 & 119.53 \\
15 & 0.10 & 25.85 & 99.02 \\
16 & --0.23 & 3.41 & 102.70 \\
\hline
\end{tabular}
\end{table}