\begin{table}%ta2
%\centering
\par
\caption{\label{tab:ex-w33a}Gaussian fit parameters for for the full extraction of the saturated absorptions of para-H$_2$O~$1_{11}{-}0_{00}$ line in W33A.}
  \begin{tabular}{lccc}
  \hline\hline\noalign{\smallskip}
Component & $T^*_{A}$ & $FHWM$ & $\varv_{\rm lsr}$ \\
   \#  & (K) & (\kms) & (\kms) \\
  \hline
1 & 0.32 & 32.95 & 42.00 \\
2 & --0.48 & 2.92 & 23.87 \\
3 & --0.79 & 4.70 & 28.41 \\
4 & --0.80 & 3.64 & 31.06 \\
5 & --0.74 & 1.60 & 32.40 \\
6 & --1.12 & 1.75 & 33.52 \\
7 & --0.98 & 1.31 & 34.46 \\
8 & --0.41 & 1.00 & 43.83 \\
9 & --0.70 & 2.20 & 41.13 \\
10 & --1.24 & 1.91 & 39.40 \\
\hline
\end{tabular}
\end{table}